-- Rollback for AwoooP RLS Canary Wave 1.1.
-- This only removes the wave1.1 policy and disables RLS on the tool registry.
-- It intentionally does not touch data.

BEGIN;

SET LOCAL lock_timeout = '5s';
SET LOCAL statement_timeout = '30s';

DROP POLICY IF EXISTS awooop_mcp_tool_registry_tenant ON awooop_mcp_tool_registry;
ALTER TABLE awooop_mcp_tool_registry NO FORCE ROW LEVEL SECURITY;
ALTER TABLE awooop_mcp_tool_registry DISABLE ROW LEVEL SECURITY;

COMMIT;
